---
title: Generic Device Plugin
description: Generic Device Plugin enables allocating generic Linux devices, such as serial devices, the FUSE device, or video cameras, to Kubernetes Pods. 
hero:
  tagline: Generic Device Plugin enables allocating generic Linux devices, such as serial devices, the FUSE device, or video cameras, to Kubernetes Pods. 
  image:
    file: https://cdn.jsdelivr.net/gh/selfhst/icons@main/webp/kubernetes.webp
  actions:
    - text: Source
      link: https://github.com/squat/generic-device-plugin
      icon: right-arrow
    - text: Deployment Chart
      link: https://gitea.alexlebens.dev/alexlebens/infrastructure/src/branch/main/clusters/cl01tl/helm/generic-device-plugin
      icon: right-arrow
---

# Purpose

Plugin used to give devices to pods, specifically tun devices for networking.

# Notes

Used by recomendation in [Tailscale Docs](https://docs.siderolabs.com/kubernetes-guides/advanced-guides/device-plugins).
