---
title: Introduction
description: Overiew of the homelab
hero:
  tagline: Steps followed for the v1.12.0 upgrade process
  image:
    file: https://cdn.jsdelivr.net/gh/selfhst/icons@main/webp/docs-collaboration.webp
sidebar:
  order: 1     
---

Overview of the homelab.

# Hardware

Currently using a mix of RPIs, Intel based NUCs, Synology NAS, and Ubiquity networking.

# Software

Kubernetes for the main cluster. Docker managed by Komodo for the single hosts.
