---
title: Rook Ceph
description: Rook is an open source cloud-native storage orchestrator for Kubernetes, providing the platform, framework, and support for Ceph storage to natively integrate with Kubernetes.
hero:
  tagline: Rook is an open source cloud-native storage orchestrator for Kubernetes, providing the platform, framework, and support for Ceph storage to natively integrate with Kubernetes.
  image:
    file: https://cdn.jsdelivr.net/gh/selfhst/icons@main/webp/ceph.webp
  actions:
    - text: Source
      link: https://github.com/rook/rook
      icon: right-arrow
    - text: Deployment Chart
      link: https://gitea.alexlebens.dev/alexlebens/infrastructure/src/branch/main/clusters/cl01tl/helm/rook-ceph
      icon: right-arrow
---
